\pdfcompresslevel=0

První stránka.

\vfill\eject

Druhá stránka.

\def\obj#1#2{
	\pdfobj{#2}
	\edef#1{\the\pdflastobj\space 0 R}
	\pdfrefobj\pdflastobj
}

% PDF Reference 1.7 section 8.3.1 (page 594)
\obj\lab{<<
	/Type /PageLabel
	/S /r
	/P (A-)
>>}

\obj\labtree{<<
	/Nums [0 \lab]
	/Limits [0 0]
>>}

\pdfcatalog{/PageLabels \labtree}

\bye
